CREATE DATABASE rbac CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
CREATE DATABASE dmp CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
CREATE DATABASE aorta CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
CREATE DATABASE logger CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;
CREATE DATABASE dicom CHARACTER SET utf8mb4 COLLATE utf8mb4_unicode_ci;